Contents

Introduction

Prerequisites

Requirements

Components Used

Verify Software Versions

FMC Software Version

FMC UI

FMC CLI

FMC REST-API

FMC Troubleshoot file

FTD or Firepower Module CLI

FTD or Firepower Module Troubleshoot file

FDM Software Version

FDM UI

FDM REST API

FTD CLI

FTD SNMP

FTD Troubleshot file

FXOS Software Version

FCM UI

FXOS CLI

FXOS REST-API

FXOS SNMP

FXOS Chassis show-tech file

FTD Software Version

FTD CLI

FTD SNMP

FMC UI

FMC REST API

FDM UI

FDM REST-API

FTD Troubleshoot file

FCM UI

FXOS CLI

FXOS REST-API

FXOS Chassis show-tech file

ASA Software Version

ASA CLI

ASA SNMP

ASA show-tech file

FCM UI

FXOS CLI

FXOS REST-API

FXOS Chassis show-tech file

Firepower Module Software Version

FMC UI

FMC REST-API

Firepower Module CLI

Firepower Module Troubleshoot file

ASA CLI

ASA show-tech file

Verify Snort, VDB, and SRU Versions

Deep Packet Inspection Engine (Snort) Version

FMC UI

FMC REST-API

FDM UI

FDM REST API

FTD or Firepower CLI

FTD or Firepower Module Troubleshoot file

Vulnerability Database (VDB) Version

FMC UI

FMC CLI

FMC REST-API

FMC Troubleshoot file

FDM UI

FDM REST API

FTD or Firepower Module CLI

FTD or Firepower Module Troubleshoot file

Intrusion rule Update Versions

FMC UI

FMC CLI

FMC REST-API

FMC Troubleshoot file

FDM UI

FDM REST API

FTD or Firepower Module CLI

FTD or Firepower Module Troubleshoot file

Known Issues

Related Information

Introduction

This document describes the verification of Firepower software versions.

Prerequisites

Requirements

Basic product knowledge, REST-API, SNMP.

Components Used

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

The information in this document is based on these software and hardware versions:

- Firepower 11xx

- Firepower 21xx

- Firepower 31xx

- Firepower 41xx

- Firepower Management Center (FMC) Version 7.1.x

- Firepower eXtensible Operating System (FXOS) 2.11.1.x

- Firepower Device Manager (FDM) 7.1.x

- Firepower Threat Defense 7.1.x

- ASA 9.17.x

Verify Software Versions

FMC Software Version

The FMC software version can be verified with the use of these options:

- FMC UI

- FMC CLI

- REST API request

- FMC troubleshoot file

- FTD or Firepower module CLI

- FTD or Firepower module troubleshoot file

FMC UI

Complete these steps to verify the FMC software version on FMC UI:

1. Choose Help > About:

2. Check Software Version:

FMC CLI

Complete these steps to verify the FMC software version on FMC CLI.

1. Access FMC via SSH or console connection. The banner displays the software version:

Cisco Firepower Extensible Operating System (FX-OS) v2.11.0 (build 154)

Cisco Secure Firewall Management Center 4600 v7.1.0 (build 90)

2. Run the show version command on CLI:

> show version

-----------[ FMC-4600-2.cisco.com ]------------

Model                     : Cisco Firepower Management Center 4600 (66) Version 7.1.0 (Build 90)

UUID                      : a10ed34e-d127-11e8-b440-728439d95305

Rules update version      : 2022-05-02-003-vrt

LSP version               : lsp-rel-20220502-1613

VDB version               : 354

----------------------------------------------------

FMC REST-API

Complete these steps to verify the FMC software version via an FMC REST-API request. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -s -k -v -X POST 'https://192.0.2.1/api/fmc_platform/v1/auth/generatetoken' -H 'Authentication: Basic' -u 'admin:Cisco123' | grep -i X-auth-access-token

< X-auth-access-token: 9408fe38-c25c-4472-b7e6-3571bb4e2b8d

2. Use the X-auth-access-token in this query:

# curl -k -X GET 'https://192.0.2.1/api/fmc_platform/v1/info/serverversion' -H 'X-auth-access-token: 9408fe38-c25c-4472-b7e6-3571bb4e2b8d'  | python -m json.tool

{

"links": {

"self": "https://192.0.2.1/api/fmc_platform/v1/info/serverversion?offset=0&limit=25"

},

"items": [

{

"serverVersion": "7.1.0 (build 90)",

"geoVersion": "2022-04-25-002",

"vdbVersion": "build 354 ( 2022-04-27 19:39:56 )",

"sruVersion": "2022-05-04-001-vrt",

"lspVersion": "lsp-rel-20220504-1121",

"type": "ServerVersion"

}

],

"paging": {

"offset": 0,

"limit": 25,

"count": 1,

"pages": 1

}

Note: The part “| python -m json.tool” of the command string is used to format output in JSON-style and is optional.

FMC Troubleshoot file

Complete these steps to verify the FMC software version in the troubleshoot file:

1. Open the troubleshoot file and navigate to the folder <filename>.tar/results-<date>--xxxxxx/dir-archives/etc/sf/

2. Open the file ims.conf and find the lines with keys SWVERSION and SWBUILD:

# pwd

/var/tmp/results-05-06-2022--199172/dir-archives/etc/sf/

# cat ims.conf  | grep -E "SWVERSION|SWBUILD"

SWVERSION=7.1.0

SWBUILD=90

FTD or Firepower Module CLI

Complete these steps to verify the FMC software version on FTD CLI or the Firepower module CLI:

1. Access FTD via SSH or console connection. In the case of the Firepower module, access the module via SSH, or from the ASA CLI via the session sfr command.

2. Run the expert command.

> expert

admin@fpr2k-1:~$

3. Run the less /ngfw/var/sf/detection_engines/<UUID>/ngfw.rules command on FTD or less /var/sf/detection_engines/<UUID>/ngfw.rules command on the Firepower module and check row DC Version:

admin@fpr2k-1:~$ less /ngfw/var/sf/detection_engines/65455e3a-c879-11ec-869a-900514578f9f/ngfw.rules

#### ngfw.rules

##############################################################################

#

# AC Name         : FTD-ACP-1652807562

# Policy Exported : Tue May 17 17:29:43 2022 (UTC)

# File Written    : Tue May 17 17:31:10 2022 (UTC)

#

# DC Version      : 7.1.0-90  OS: 90

# SRU             : 2022-05-11-001-vrt

# VDB             : 354

#

##############################################################################

...

FTD or Firepower Module Troubleshoot file

Complete these steps to verify the FMC software version in the FTD or the Firepower module troubleshoot file:

1. Open the troubleshoot file and navigate to the folder <filename>-troubleshoot .tar/results-<date>--xxxxxx/file-contents/ngfw/var/sf/detection-engines/<UUID>/ if the file was generated on FTD. For the Firepower module, navigate to the folder <filename>-troubleshoot .tar/results-<date>--xxxxxx/file-contents/var/sf/detection-engines/<UUID>/

2. Open the ngfw.rules file and check row DC Version:

# pwd

/var/tmp/results-05-06-2022--163203/file-contents/ngfw/var/sf/detection_engines/5e9fa23a-5429-11ec-891e-b19e407404d5

# cat ngfw.rules

#### ngfw.rules

##############################################################################

#

# AC Name         : FTD-ACP-1652807562

# Policy Exported : Tue May 17 17:29:43 2022 (UTC)

# File Written    : Tue May 17 17:31:10 2022 (UTC)

#

# DC Version      : 7.1.0-90  OS: 90

# SRU             : 2022-05-11-001-vrt

# VDB             : 354

#

##############################################################################

...

FDM Software Version

The FDM software version can be verified with the use of these options:

- FDM UI

- FTD CLI

- FTD SNMP poll

- FTD troubleshoot file

- FDM REST API

- Firepower Chassis Manager (FCM) UI

- FXOS CLI

- FXOS REST API

- FXOS chassis show-tech file

FDM UI

To verify the software version on FDM UI check Software on the main page:

FDM REST API

Complete these steps to verify the FDM software version via an FDM REST-API request. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -k -X POST --header 'Content-Type: application/json' --header 'Accept: application/json' -d '{ "grant_type": "password", "username": "admin", "password": "Admin#1324" }' 'https://192.0.2.2/api/fdm/latest/fdm/token'

{

"access_token":

"eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTIyNDk5NTcsInN1YiI6ImFkbWluIiwianRpIjoiNDk3MmRjNjAtZDBmMi0xMWVjLTk4ZWMtNDdlZTQwODkwMDVjIiwibmJmIjoxNjUyMjQ5OTU3LCJleHAiOjE2NTIyNTE3NTcsInJlZnJlc2hUb2tlbkV4cGlyZXNBdCI6MTY1MjI1MjM1NzQ1NywidG9rZW5UeXBlIjoiSldUX0FjY2VzcyIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.lJLmHddJ2jaVRmpdXF6qg48qdBcyRuit94DLobCJ9LI",

"expires_in": 1800,

"refresh_expires_in": 2400,

"refresh_token": "eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTIzOTQxNjksInN1YiI6ImFkbWluIiwianRpIjoiMGU0NGIxYzQtZDI0Mi0xMWVjLTk4ZWMtYTllOTlkZGMwN2Y0IiwibmJmIjoxNjUyMzk0MTY5LCJleHAiOjE2NTIzOTY1NjksImFjY2Vzc1Rva2VuRXhwaXJlc0F0IjoxNjUyMzk1OTY5MDcwLCJyZWZyZXNoQ291bnQiOi0xLCJ0b2tlblR5cGUiOiJKV1RfUmVmcmVzaCIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.Avga0-isDjQB527d3QWZQb7AS4a9ea5wlbYUn-A9aPw",

"token_type": "Bearer"

}

2. Use the access token value in this query:

# curl -s -k -X GET -H 'Accept: application/json' -H 'Authorization: Bearer eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTIyNDk5NTcsInN1YiI6ImFkbWluIiwianRpIjoiNDk3MmRjNjAtZDBmMi0xMWVjLTk4ZWMtNDdlZTQwODkwMDVjIiwibmJmIjoxNjUyMjQ5OTU3LCJleHAiOjE2NTIyNTE3NTcsInJlZnJlc2hUb2tlbkV4cGlyZXNBdCI6MTY1MjI1MjM1NzQ1NywidG9rZW5UeXBlIjoiSldUX0FjY2VzcyIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.lJLmHddJ2jaVRmpdXF6qg48qdBcyRuit94DLobCJ9LI' 'https://192.0.2.2/api/fdm/v6/operational/systeminfo/default' | grep -i software

"softwareVersion" : "7.1.0-90",

"softwareVersion" : "7.1.0-90",

FTD CLI

Complete the steps in the section.

FTD SNMP

Complete the steps in the section.

FTD Troubleshot file

Complete the steps in the section.

FCM UI

FCM is available on Firepower 4100 and Firepower 9300 Series. Complete the steps in the section.

FXOS CLI

Complete the steps in the section.

FXOS REST-API

Complete the steps in the section.

FXOS Chassis show-tech file

Complete the steps in the section.

FXOS Software Version

The FXOS software version can be verified with the use of these options:

- FCM UI (Firepower 4100/9300 only)

- FXOS CLI

- FXOS REST API

- FXOS SNMP poll

- FXOS chassis show-tech file.

FCM UI

To verify the FXOS software version on FCM UI check Version on the main page:

FXOS CLI

Firepower 4100/9300

Complete these steps to verify the FXOS software version on FXOS CLI:

1. Establish a console or SSH connection to the chassis.

2. Switch to scope system and run the show firmware monitor command:

firepower # scope system

firepower /system # show firmware monitor

FPRM:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

Fabric Interconnect A:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

Chassis 1:

Server 1:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

Server 2:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

Server 3:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

Firepower 1000/2100/3100 with FTD

Complete these steps to verify the FXOS software version on FXOS CLI:

1. Establish console connection to the chassis or SSH connection to FTD.

In the case of the SSH connection to the FTD, run the connect fxos command on FTD CLISH:

> connect fxos

2. Switch to the scope system and run the show firmware detail command:

firepower # scope system

firepower /system # show firmware detail

Version: 7.1.0-90

Startup-Vers: 7.1.0-90

MANAGER:

Boot Loader:

Firmware-Vers: 1012.0200.0213

Rommon-Vers: 1.0.12

Fpga-Vers: 2.0.00

Fpga-Golden-Vers:

Power-Sequencer-Vers: 2.13

Firmware-Status: OK

SSD-Fw-Vers: 0147

System:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 7.1.0-90

Startup-Vers: 2.11(1.154)

NPU:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 7.1.0-90

Startup-Vers: 2.11(1.154)

Service Manager:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 7.1.0-90

Startup-Vers: 2.11(1.154)

Firepower 1000/3100 with ASA, Firepower 2100 with ASA in appliance mode

Complete these steps to verify the FXOS software version on FXOS CLI:

1. Establish console connection to the chassis or telnet/SSH connection to ASA.

In the case of the telnet/SSH connection to ASA, run the connect fxos command on ASA CLI.

asa# connect fxos

2. Switch to the scope system  and run the show firmware detail command:

firepower # scope system

firepower /system # show firmware detail

Version: 9.17.1

Startup-Vers: 9.17.1

MANAGER:

Boot Loader:

Firmware-Vers: 1012.0200.0213

Rommon-Vers: 1.0.12

Fpga-Vers: 2.0.00

Fpga-Golden-Vers:

Power-Sequencer-Vers: 2.13

Firmware-Status: OK

SSD-Fw-Vers: 0147

System:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 9.17.1

Startup-Vers: 2.11(1.154)

NPU:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 9.17.1

Startup-Vers: 2.11(1.154)

Service Manager:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 9.17.1

Startup-Vers: 2.11(1.154)

Firepower 2100 with ASA in platform mode

Complete these steps to verify the FXOS software version on FXOS CLI:

1. Establish SSH or console connection to the chassis or telnet/SSH connection to ASA.

In the case of the telnet/SSH connection to ASA, run the connect fxos command on ASA CLI.

asa# connect fxos

2. Switch to the scope system and run the show firmware detail command:

firepower # scope system

firepower /system # show firmware detail

Version: 9.17.1

Startup-Vers: 9.17.1

MANAGER:

Boot Loader:

Firmware-Vers: 1012.0200.0213

Rommon-Vers: 1.0.12

Fpga-Vers: 2.0.00

Fpga-Golden-Vers:

Power-Sequencer-Vers: 2.13

Firmware-Status: OK

SSD-Fw-Vers: 0147

System:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 9.17.1

Startup-Vers: 2.11(1.154)

NPU:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 9.17.1

Startup-Vers: 2.11(1.154)

Service Manager:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 9.17.1

Startup-Vers: 2.11(1.154)

FXOS REST-API

FXOS REST-API is supported on Firepower 4100/9300 Series.

Firepower 4100/9300

Complete these steps to verify the FXOS software version via an FXOS REST-API request. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -k -X POST -H 'USERNAME: admin' -H 'PASSWORD: Cisco123' 'https://192.0.2.100/api/login'

{

"refreshPeriod": "0",

"token": "1206f6a3032e7bdbeac07cfdd9d5add5cdd948e4e5f4511535a959aed7e1e2f5"

}

2. Use the token in this query:

# curl -s -k -X GET -H 'Accept: application/json' -H 'token: 1206f6a3032e7bdbeac07cfdd9d5add5cdd948e4e5f4511535a959aed7e1e2f5'  'https://192.0.2.100/api/sys/firmware/install-platform-fw' | grep -i  platformBundle

"platformBundleName": "fxos-k9.2.11.1.154.SPA",

"platformBundleVersion": "2.11(1.154)",

FXOS SNMP

SNMP configuration on FXOS is supported on Firepower 2100 with ASA in platform mode and Firepower 4100/9300.

Firepower 4100/9300

Complete these steps to verify the FXOS software version via SNMP:

1. Ensure that SNMP is configured on FXOS. Refer to Configure SNMP on Firepower NGFW Appliances for configuration steps.

2. Poll .1.3.6.1.4.1.9.9.826.1.30.47.1.6 or CISCO-FIREPOWER-FIRMWARE-MIB:: cfprFirmwareRunningPackageVersion:

# snmpwalk -On -v2c -c cisco 192.0.2.100 .1.3.6.1.4.1.9.9.826.1.30.47.1.6

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.20823 = STRING: "2.11(1.154)"

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.25326 = ""

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.25331 = STRING: "2.11(1.154)"

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.30266 = STRING: "1.0.18"

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.30269 = STRING: "1.0.18"

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.30779 = ""

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.30780 = STRING: "2.11(1.154)"

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.30781 = STRING: "2.11(1.154)"

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.32615 = STRING: "2.11(1.154)"

.1.3.6.1.4.1.9.9.826.1.30.47.1.6.48820 = STRING: "0.0"

Firepower 2100 with ASA in platform mode

Complete these steps to verify the FXOS software version via SNMP:

1. Ensure that SNMP is configured on FXOS. Refer to Configure SNMP on Firepower NGFW Appliances for configuration steps.

2. Poll .1.3.6.1.2.1.1.1.0 or SNMPv2-MIB::sysDescr.0:

# snmpwalk -On -v2c -c cisco 192.0.2.101 SNMPv2-MIB::sysDescr.0

.1.3.6.1.2.1.1.1.0 = STRING: Cisco FirePOWER FPR-2140 Security Appliance, System Version 2.11(1.146)

# snmpwalk -On -v2c -c cisco 192.0.2.101 .1.3.6.1.2.1.1.1.0

.1.3.6.1.2.1.1.1.0 = STRING: Cisco FirePOWER FPR-2140 Security Appliance, System Version 2.11(1.146)

FXOS Chassis show-tech file

Firepower 4100/9300

Complete these steps to verify the FXOS software version in the FXOS chassis show-tech file:

1. For FXOS versions 2.7 and later, open file sam_techsupportinfo in <name>_BC1_all.tar/ FPRM_A_TechSupport.tar.gz/FPRM_A_TechSupport.tar

For earlier versions, open file sam_techsupportinfo in FPRM_A_TechSupport.tar.gz/ FPRM_A_TechSupport.tar.

2. Check the output of the `show firmware monitor` command:

# pwd

/var/tmp/20220313201802_F241-01-11-FPR-2_BC1_all/FPRM_A_TechSupport/

# cat sam_techsupportinfo

...

`show firmware monitor`

FPRM:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

Fabric Interconnect A:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

Chassis 1:

Server 1:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

Server 2:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

Server 3:

Package-Vers: 2.11(1.154)

Upgrade-Status: Ready

...

Firepower 1000/2100/3100

1. Open file tech_support_brief in <name>_FPRM.tar.gz/<name>_FPRM.tar

2. Check the output of the `show firmware detail` command:

# pwd

/var/tmp/fp2k-1_FPRM/

# cat tech_support_brief

...

`show firmware detail`

Version: 7.1.0-90

Startup-Vers: 7.1.0-90

MANAGER:

Boot Loader:

Firmware-Vers: 1012.0200.0213

Rommon-Vers: 1.0.12

Fpga-Vers: 2.0.00

Fpga-Golden-Vers:

Power-Sequencer-Vers: 2.13

Firmware-Status: OK

SSD-Fw-Vers: 0147

System:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 7.1.0-90

Startup-Vers: 2.11(1.154)

NPU:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 7.1.0-90

Startup-Vers: 2.11(1.154)

Service Manager:

Running-Vers: 2.11(1.154)

Platform-Vers: 2.11.1.154

Package-Vers: 7.1.0-90

Startup-Vers: 2.11(1.154)

...

FTD Software Version

The FTD software version can be verified with the use of these options:

- FTD CLI

- FTD SNMP poll

- FTD troubleshoot file

- FMC UI

- FMC REST API

- FDM UI

- FDM REST API

- FCM UI

- FXOS CLI

- FXOS REST API

- FXOS Chassis show-tech file

FTD CLI

Complete these steps to verify the FTD software version on FTD CLI:

1. Use these options to access the FTD CLI in accordance with the platform and deployment mode:

- Direct SSH access to FTD - all platforms

- Access from the FXOS console CLI (Firepower 1000/2100/3100) via command connect ftd

- Access from the FXOS CLI via commands (Firepower 4100/9300):

connect module <x> [console|telnet], where x is the slot ID, and then

connect ftd [instance], where the instance is relevant only for multi-instance deployment.

- For virtual FTDs, direct SSH access to FTD, or console access from the hypervisor or cloud UI

2. Run the show version command on CLI:

> show version

-------------------[ firepower ]--------------------

Model                     : Cisco Firepower 2120 Threat Defense (77) Version 7.1.0 (Build 90)

UUID                      : 1b324aaa-670e-11ec-ac2b-e000f0bd3ca1

LSP version               : lsp-rel-20220328-1342

VDB version               : 353

----------------------------------------------------

FTD SNMP

Complete these steps to verify the FTD software version via SNMP:

1. Ensure that SNMP is configured and enabled. For FDM-managed FTD, refer to Configure and troubleshoot SNMP on Firepower FDM for configuration steps. For FMC-managed FTD, refer to Configure SNMP on Firepower NGFW Appliances for configuration steps.

2. Poll OID SNMPv2-MIB::sysDescr.0 or OID .1.3.6.1.2.1.1.1.0.:

# snmpwalk -v2c -c cisco123 192.0.2.2 SNMPv2-MIB::sysDescr.0

SNMPv2-MIB::sysDescr.0 = STRING: Cisco Firepower Threat Defense, Version 7.1.0 (Build 90), ASA Version 9.17(1)

# snmpwalk -v2c -c cisco123 192.0.2.2 SNMPv2-MIB::sysDescr.0 .1.3.6.1.2.1.1.1.0

SNMPv2-MIB::sysDescr.0 = STRING: Cisco Firepower Threat Defense, Version 7.1.0 (Build 90), ASA Version 9.17(1)

FMC UI

Complete these steps to verify the FTD software version on FMC UI:

1. Choose Devices > Device Management:

2. Check the Version column:

FMC REST API

Complete these steps to verify the FTD software version via FMC REST-API. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -s -k -v -X POST 'https://192.0.2.1/api/fmc_platform/v1/auth/generatetoken' -H 'Authentication: Basic' -u 'admin:Cisco123' | grep -i X-auth-access-token

< X-auth-access-token: 5d817ef7-f12f-4dae-b0c0-cd742d3bd2eb

2. Identify the domain that contains the device. In the majority of the REST API queries the domain parameter is mandatory. Use the X-auth-access-token in this query to retrieve the list of domains:

# curl -s -k -X 'GET'  'https://192.0.2.1/api/fmc_platform/v1/info/domain' -H 'accept: application/json'  -H 'X-auth-access-token: 5d817ef7-f12f-4dae-b0c0-cd742d3bd2eb' | python -m json.tool

{

"items": [

{

"name": "Global",

"type": "Domain",

"uuid": "e276abec-e0f2-11e3-8169-6d9ed49b625f"

},

{

"name": "Global/domain1",

"type": "Domain",

"uuid": "ef0cf3e9-bb07-8f66-5c4e-000000000001"

},

{

"name": "Global/domain2",

"type": "Domain",

"uuid": "341a8f03-f831-c364-b751-000000000001"

}

],

"links": {

"self": "https://192.0.2.1/api/fmc_platform/v1/info/domain?offset=0&limit=25"

},

"paging": {

"count": 3,

"limit": 25,

"offset": 0,

"pages": 1

}

}

3.  Use the domain UUID to query for the devicerecords:

# curl -s -k -X 'GET'  'https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords' -H 'accept: application/json'  -H 'X-auth-access-token: 5d817ef7-f12f-4dae-b0c0-cd742d3bd2eb' | python -m json.tool

{

"items": [

{

"id": "a4752f3c-86cc-11e9-8c9a-a3c958bed664",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/a4752f3c-86cc-11e9-8c9a-a3c958bed664"

},

"name": "fw1.lab.local",

"type": "Device"

},

{

"id": "05e9799c-94fc-11ea-ad33-a0032ddb0251",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/05e9799c-94fc-11ea-ad33-a0032ddb0251"

},

"name": "fw2.lab.local",

"type": "Device"

},

{

"id": "c8bef462-49f7-11e8-b2fb-ad9838c6ed90",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/c8bef462-49f7-11e8-b2fb-ad9838c6ed90"

},

"name": "fw3.lab.local",

"type": "Device"

},

{

"id": "3c41913a-b27b-11eb-b131-d2e2ce2a368d",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/3c41913a-b27b-11eb-b131-d2e2ce2a368d"

},

"name": "fw4.lab.local",

"type": "Device"

},

{

"id": "48f7f37c-8cf0-11e9-bf41-fb2d7b740db7",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/48f7f37c-8cf0-11e9-bf41-fb2d7b740db7"

},

"name": "fw5.lab.local",

"type": "Device"

},

{

"id": "0b1a9c94-8ba8-11ec-b2fd-93263934908d",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/0b1a9c94-8ba8-11ec-b2fd-93263934908d"

},

"name": "fpr2k-1",

"type": "Device"

},

4. Use the domain UUID and the device/container UUID:

# curl -s -k -X GET 'https://192.0.2.1/api/fmc_config/v1/domain/e276abec-e0f2-11e3-8169-6d9ed49b625f/devices/devicerecords/0b1a9c94-8ba8-11ec-b2fd-93263934908d/operational/commands?offset=0&limit=25&command=show%20version' -H 'X-auth-access-token: f3233164-6ab8-4e33-90cc-2612c19571be' | python -m json.tool

{

"items": [

{

"commandInput": "show version",

"commandOutput": "--------------------[ fpr2k-1 ]---------------------\nModel                     : Cisco Firepower 2110 Threat Defense (77) Version 7.1.0 (Build 90)\nUUID                      : 0b1a9c94-8ba8-11ec-b2fd-93263934908d\nLSP version               : lsp-rel-20220502-1613\nVDB version               : 353\n----------------------------------------------------\n\nCisco Adaptive Security Appliance Software Version 9.17(1) \nSSP Operating System Version 2.11(1.154)\n\nCompiled on Tue 30-Nov-21 19:37 GMT by builders\nSystem image file is \"disk0:/mnt/boot/installables/switch/fxos-k8-fp2k-npu.2.11.1.154.SPA\"\nConfig file at boot was \"startup-config\"\n\nfpr2k-1 up 10 days 4 hours\nfailover cluster up 57 days 17 hours\nStart-up time 37 secs\n\nHardware:   FPR-2110, 6588 MB RAM, CPU MIPS 1200 MHz, 1 CPU (6 cores)\n\n\n 1: Int: Internal-Data0/1    : address is 000f.b748.4801, irq 0\n 3: Ext: Management1/1       : address is 707d.b9e2.836d, irq 0\n 4: Int: Internal-Data1/1    : address is 0000.0100.0001, irq 0\n 5: Int: Internal-Data1/2    : address is 0000.0300.0001, irq 0\n 6: Int: Internal-Control1/1 : address is 0000.0001.0001, irq 0\n\nSerial Number: JAD213508B6\nConfiguration last modified by enable_1 at 04:12:18.743 UTC Wed May 4 2022\n",

"type": "command"

}

],

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/e276abec-e0f2-11e3-8169-6d9ed49b625f/devices/devicerecords/0b1a9c94-8ba8-11ec-b2fd-93263934908d/operational/commands?offset=0&limit=25&command=show version"

},

"paging": {

"count": 1,

"limit": 25,

"offset": 0,

"pages": 1

}

FDM UI

Complete the steps in the section.

FDM REST-API

Complete the steps in the section.

FTD Troubleshoot file

Complete these steps to verify the FTD software version in the FTD troubleshoot file:

1. Open the troubleshoot file and navigate to the folder <filename>-troubleshoot .tar/results-<date>--xxxxxx/command-outputs/

2. Open the file usr-local-sf-bin-sfcli.pl show version.output and find the line with Model:

# pwd

/var/tmp/results-05-06-2022--199172/dir-archives/etc/sf/

# cat "usr-local-sf-bin-sfcli.pl show version.output"

--------------------[ fpr2k-1 ]---------------------

Model                     : Cisco Firepower 2110 Threat Defense (77) Version 7.1.0 (Build 90)

UUID                      : 0b1a9c94-8ba8-11ec-b2fd-93263934908d

LSP version               : lsp-rel-20220510-1044

VDB version               : 354

----------------------------------------------------

FCM UI

For FTD on Firepower 4100/9300 use the FCM and check the Version in the Logical Devices tab:

FXOS CLI

FTD on Firepower 4100/9300

Complete these steps to verify the FTD software version on FXOS CLI:

1. Establish a console or SSH connection to the chassis.

2. Switch to the scope ssa and run the show app-instance command:

firepower# scope ssa

firepower /ssa # show app-instance

App Name   Identifier Slot ID    Admin State Oper State       Running Version Startup Version Deploy Type Turbo Mode Profile Name Cluster State   Cluster Role

---------- ---------- ---------- ----------- ---------------- --------------- --------------- ----------- ---------- ------------ --------------- ------------

asa        ASA        1          Enabled     Online           9.16.2.7        9.16.2.7        Native      No                      Not Applicable  None

ftd        FTD-MI-1   3          Enabled     Online           7.1.0.90        7.1.0.90        Container   No         RP110        Not Applicable  None

FTD on Firepower 1000/2100/3100

Complete these steps to verify the FTD software version on FXOS CLI:

1. Establish a console connection to the chassis or SSH connection to the FTD

In the case of the SSH connection to the FTD, run the connect fxos command on FTD CLISH:

> connect fxos

2. Switch to the scope ssa and run the show app-instance command:

firepower# scope ssa

firepower /ssa # show app-instance

Application Name     Slot ID    Admin State     Operational State    Running Version Startup Version Deploy Type Profile Name Cluster Oper State   Cluster Role

-------------------- ---------- --------------- -------------------- --------------- --------------- ----------- ------------ -------------------- ------------

ftd                  1          Enabled         Online               7.1.0.90        7.1.0.90        Native                   Not Applicable       None

FXOS REST-API

Complete these steps to verify the FTD software version via an FXOS REST-API:

1. Request an authentication token:

# curl -s -k -X POST -H 'USERNAME: admin' -H 'PASSWORD: cisco' 'https://192.0.2.100/api/login'

{

"refreshPeriod": "0",

"token": "28821660bc74e418f3fadc443619df0387d69e7b150e035f688bed9d347b4838"

}

2. Use the token in this query and ensure to specify the slot ID where the FTD is installed:

# curl -s -k -X GET -H 'Accept: application/json' -H 'token: 28821660bc74e418f3fadc443619df0387d69e7b150e035f688bed9d347b4838' 'https://192.0.2.100/api/slot/3/app-inst' | grep -Ei "identifier|version"

"identifier": "FTD-MI-1",

"runningVersion": "7.1.0.90",

"hwCryptoVersion": "2",

"startupVersion": "7.0.1.84",

"versionIncompatibleErrorMgr": ""

FXOS Chassis show-tech file

Complete these steps to verify the FTD software version in the FXOS chassis show-tech file:

FTD on Firepower 4100/9300

1. For FXOS versions 2.7 and later, open file sam_techsupportinfo in <name>_BC1_all.tar/ FPRM_A_TechSupport.tar.gz/FPRM_A_TechSupport.tar

For earlier versions, open file sam_techsupportinfo in FPRM_A_TechSupport.tar.gz/ FPRM_A_TechSupport.tar.

2. Check the section for each slot under the `show slot expand detail`:

# pwd

/var/tmp/20220313201802_F241-01-11-FPR-2_BC1_all/FPRM_A_TechSupport/

# cat sam_techsupportinfo

...

`show slot expand detail`

Slot:

Slot ID: 3

Log Level: Info

Admin State: Ok

Oper State: Online

Disk Format State: Ok

Disk Format Status: 100%

Clear Log Data: Available

Error Msg:

Application Instance:

App Name: ftd

Identifier: FTD-MI-1

Admin State: Enabled

Oper State: Online

Running Version: 7.1.0.90

Startup Version: 7.1.0.90

Deploy Type: Container

...

FTD on Firepower 1000/2100/3100

1. Open file tech_support_brief in <name>_FPRM.tar.gz/<name>_FPRM.tar

2. Check the sections `scope ssa` and  `show slot `:

# pwd

/var/tmp/fp2k-1_FPRM/

# cat tech_support_brief

...

`scope ssa`

`show slot`

Slot:

Slot ID    Log Level Admin State  Operational State

---------- --------- ------------ -----------------

1          Info      Ok           Online

`show app`

Application:

Name       Version    Description Author     Deploy Type CSP Type    Is Default App

---------- ---------- ----------- ---------- ----------- ----------- --------------

ftd        7.1.0.90   N/A         cisco      Native      Application Yes

`show app-instance detail`

Application Name: ftd

Slot ID: 1

Admin State: Enabled

Operational State: Online

Running Version: 7.1.0.90

Startup Version: 7.1.0.90

...

ASA Software Version

The ASA software version can be verified with the use of these options:

- ASA CLI

- ASA SNMP poll

- ASA show-tech file

- FCM UI

- FXOS CLI

- FXOS REST API

- FXOS chassis show-tech file

ASA CLI

Complete these steps to verify the ASA software version on ASA CLI:

1. Use these options to access the ASA CLI in accordance with the platform and deployment mode:

- Direct telnet/SSH access to ASA on Firepower 1000/3100 and Firepower 2100 in appliance mode

- Access from FXOS console CLI on Firepower 2100 in platform mode and connect to ASA via the connect asa command

- Access from FXOS CLI via commands (Firepower 4100/9300):

connect module <x> [console|telnet], where x is the slot ID, and then connect asa

- For virtual ASA, direct SSH access to ASA, or console access from the hypervisor or cloud UI

2. Run the show version command:

ciscoasa# show version

Cisco Adaptive Security Appliance Software Version 9.17(1)

SSP Operating System Version 2.11(1.154)

Device Manager Version 7.17(1)

Compiled on Tue 30-Nov-21 19:37 GMT by builders

System image file is "disk0:/mnt/boot/installables/switch/fxos-k8-fp2k-npu.2.11.1.154.SPA"

Config file at boot was "startup-config"

ciscoasa up 4 hours 40 mins

Start-up time 1 sec

ASA SNMP

Complete these steps to verify the ASA software version via SNMP:

1. Ensure that SNMP is configured and enabled.

2. Use SNMP client to poll OID SNMPv2-MIB::sysDescr.0 or OID .1.3.6.1.2.1.1.1.0:

# snmpwalk -v2c -c cisco123 192.0.2.2 SNMPv2-MIB::sysDescr.0

SNMPv2-MIB::sysDescr.0 = STRING: Cisco Adaptive Security Appliance Version 9.17(1)

# snmpwalk -v2c -c cisco123 192.0.2.2 SNMPv2-MIB::sysDescr.0 .1.3.6.1.2.1.1.1.0

SNMPv2-MIB::sysDescr.0 = Cisco Adaptive Security Appliance Version 9.17(1)

ASA show-tech file

Search for the line with the Cisco Adaptive Security Appliance Software Version string:

Cisco Adaptive Security Appliance Software Version 9.17(1)

SSP Operating System Version 2.11(1.154)

Device Manager Version 7.17(1)

...

FCM UI

Complete the steps in the section.

FXOS CLI

Complete the steps in the section.

FXOS REST-API

Complete the steps in the section.

FXOS  Chassis show-tech file

Complete the steps in the  section.

Firepower Module Software Version

The Firepower module on ASA is the new name for the older Sourcefire modules or SFR.

Its software version can be verified with the use of these options:

- FMC UI

- FMC REST-API

- Firepower module CLI

- Firepower module troubleshoot file

- ASA CLI

- ASA show-tech file

FMC UI

Complete the steps in the section.

FMC REST-API

Complete the steps in the section.

Firepower Module CLI

Complete these steps to verify the Firepower module software version on the module CLI:

1. Connect to the module via SSH or from the ASA CLI via the session sfr command.

2. Run the show version command:

> show version

----------------[ sfr1 ]-----------------

Model                     : ASA5516 (72) Version 7.1.0 (Build 90)

UUID                      : c049dad8-c42e-11e9-986d-bdeff3ce399e

Rules update version      : 2022-05-10-001-vrt

VDB version               : 354

----------------------------------------------------

Firepower Module Troubleshoot file

Complete these steps to verify the Firepower module software version in the module troubleshoot file:

1. Open the troubleshoot file and navigate to the folder <filename>-troubleshoot .tar/results-<date>--xxxxxx/command-outputs/

2. Open the file usr-local-sf-bin-sfcli.pl show version.output and find the line with Model:

# pwd

/var/tmp/results-05-12-2022--199172/command-outputs

# cat "usr-local-sf-bin-sfcli.pl show version.output"

----------------[ sfr1 ]-----------------

Model                     : ASA5516 (72) Version 7.1.0 (Build 90)

UUID                      : c049dad8-c42e-11e9-986d-bdeff3ce399e

LSP version               : 2022-05-10-001-vrt

VDB version               : 354

----------------------------------------------------

ASA CLI

Run the show module sfr details command on the ASA CLI and check the Software version:

asa# show module sfr details

Getting details from the Service Module, please wait...

Card Type:          FirePOWER Services Software Module

Model:              ASA5516

Hardware version:   N/A

Serial Number:      JAD222103XA

Firmware version:   N/A

Software version:   7.1.0-90

MAC Address Range:  7872.5dce.b3b2 to 7872.5dce.b3b2

App. name:          ASA FirePOWER

App. Status:        Up

App. Status Desc:   Normal Operation

App. version:       7.1.0-90

Data Plane Status:  Up

Console session:    Ready

Status:             Up

DC addr:            No DC Configured

Mgmt IP addr:       192.168.45.45

Mgmt Network mask:  255.255.255.0

Mgmt Gateway:       0.0.0.0

Mgmt web ports:     443

Mgmt TLS enabled:   true

ASA show-tech file

Search for the line with the show module sfr detail string:

------------------ show module sfr detail ------------------

Getting details from the Service Module, please wait...

Card Type:          FirePOWER Services Software Module

Model:              ASA5516

Hardware version:   N/A

Serial Number:      JAD222103XA

Firmware version:   N/A

Software version:   7.1.0-90

MAC Address Range:  7872.5dce.b3b2 to 7872.5dce.b3b2

App. name:          ASA FirePOWER

App. Status:        Up

App. Status Desc:   Normal Operation

App. version:       7.1.0-90

Data Plane Status:  Up

Console session:    Ready

Status:             Up

DC addr:            No DC Configured

Mgmt IP addr:       192.168.45.45

Mgmt Network mask:  255.255.255.0

Mgmt Gateway:       0.0.0.0

Mgmt web ports:     443

Mgmt TLS enabled:   true

Verify Snort, VDB, and SRU Versions

Deep Packet Inspection Engine (Snort) Version

The Snort version can be verified with the use of these options:

- FMC UI

- FMC REST-API

- FDM UI

- FDM REST API

- FTD or Firepower module CLI

- FTD or Firepower module troubleshoot file

FMC UI

Complete these steps to verify the FTD Snort version on FMC UI:

1. Choose Devices > Device Management:

2. Check the Snort label:

FMC REST-API

Complete these steps to verify the FTD Snort version via FMC REST-API. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -s -k -v -X POST 'https://192.0.2.1/api/fmc_platform/v1/auth/generatetoken' -H 'Authentication: Basic' -u 'admin:Cisco123' | grep -i X-auth-access-token

< X-auth-access-token: 5d817ef7-f12f-4dae-b0c0-cd742d3bd2eb

2. Identify the domain that contains the device. In the majority of the REST API queries the domain parameter is mandatory. Use the X-auth-access-token in this query to retrieve the list of domains:

# curl -s -k -X 'GET'  'https://192.0.2.1/api/fmc_platform/v1/info/domain' -H 'accept: application/json'  -H 'X-auth-access-token: 5d817ef7-f12f-4dae-b0c0-cd742d3bd2eb' | python -m json.tool

{

"items": [

{

"name": "Global",

"type": "Domain",

"uuid": "e276abec-e0f2-11e3-8169-6d9ed49b625f"

},

{

"name": "Global/domain1",

"type": "Domain",

"uuid": "ef0cf3e9-bb07-8f66-5c4e-000000000001"

},

{

"name": "Global/domain2",

"type": "Domain",

"uuid": "341a8f03-f831-c364-b751-000000000001"

}

],

"links": {

"self": "https://192.0.2.1/api/fmc_platform/v1/info/domain?offset=0&limit=25"

},

"paging": {

"count": 3,

"limit": 25,

"offset": 0,

"pages": 1

}

}

3. Use the domain UUID to query for the devicerecords:

# curl -s -k -X 'GET'  'https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords' -H 'accept: application/json'  -H 'X-auth-access-token: 5d817ef7-f12f-4dae-b0c0-cd742d3bd2eb' | python -m json.tool

{

"items": [

{

"id": "a4752f3c-86cc-11e9-8c9a-a3c958bed664",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/a4752f3c-86cc-11e9-8c9a-a3c958bed664"

},

"name": "fw1.lab.local",

"type": "Device"

},

{

"id": "05e9799c-94fc-11ea-ad33-a0032ddb0251",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/05e9799c-94fc-11ea-ad33-a0032ddb0251"

},

"name": "fw2.lab.local",

"type": "Device"

},

{

"id": "c8bef462-49f7-11e8-b2fb-ad9838c6ed90",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/c8bef462-49f7-11e8-b2fb-ad9838c6ed90"

},

"name": "fw3.lab.local",

"type": "Device"

},

{

"id": "3c41913a-b27b-11eb-b131-d2e2ce2a368d",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/3c41913a-b27b-11eb-b131-d2e2ce2a368d"

},

"name": "fw4.lab.local",

"type": "Device"

},

{

"id": "48f7f37c-8cf0-11e9-bf41-fb2d7b740db7",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/48f7f37c-8cf0-11e9-bf41-fb2d7b740db7"

},

"name": "fw5.lab.local",

"type": "Device"

},

{

"id": "0b1a9c94-8ba8-11ec-b2fd-93263934908d",

"links": {

"self": "https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/0b1a9c94-8ba8-11ec-b2fd-93263934908d"

},

"name": "fpr2k-1",

"type": "Device"

},

4. Use the domain UUID and the device/container UUID in this request:

# curl -s -k -X GET 'https://192.0.2.1/api/fmc_config/v1/domain/ef0cf3e9-bb07-8f66-5c4e-000000000001/devices/devicerecords/0b1a9c94-8ba8-11ec-b2fd-93263934908d' -H 'X-auth-access-token: 5d817ef7-f12f-4dae-b0c0-cd742d3bd2eb ' | python -m json.tool | grep -i snort

"snortVersion": "3.1.7.1-108",

"snortEngine": "SNORT3",

FDM UI

Complete these steps to verify the FTD Snort version on FDM UI:

1. Go to the Updates page:

2. Check Snort Inspection Engine:

FDM REST API

Complete these steps to verify the Snort version via an FDM REST-API request. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -k -X POST --header 'Content-Type: application/json' --header 'Accept: application/json' -d '{ "grant_type": "password", "username": "admin", "password": "Admin#1324" }' 'https://192.0.2.2/api/fdm/latest/fdm/token'

{

"access_token":

"eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTIyNDk5NTcsInN1YiI6ImFkbWluIiwianRpIjoiNDk3MmRjNjAtZDBmMi0xMWVjLTk4ZWMtNDdlZTQwODkwMDVjIiwibmJmIjoxNjUyMjQ5OTU3LCJleHAiOjE2NTIyNTE3NTcsInJlZnJlc2hUb2tlbkV4cGlyZXNBdCI6MTY1MjI1MjM1NzQ1NywidG9rZW5UeXBlIjoiSldUX0FjY2VzcyIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.lJLmHddJ2jaVRmpdXF6qg48qdBcyRuit94DLobCJ9LI",

"expires_in": 1800,

"refresh_expires_in": 2400,

"refresh_token": "eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTIzOTQxNjksInN1YiI6ImFkbWluIiwianRpIjoiMGU0NGIxYzQtZDI0Mi0xMWVjLTk4ZWMtYTllOTlkZGMwN2Y0IiwibmJmIjoxNjUyMzk0MTY5LCJleHAiOjE2NTIzOTY1NjksImFjY2Vzc1Rva2VuRXhwaXJlc0F0IjoxNjUyMzk1OTY5MDcwLCJyZWZyZXNoQ291bnQiOi0xLCJ0b2tlblR5cGUiOiJKV1RfUmVmcmVzaCIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.Avga0-isDjQB527d3QWZQb7AS4a9ea5wlbYUn-A9aPw",

"token_type": "Bearer"

}

2. Use the access_token value in this query:

# curl -s -k -X GET -H 'Accept: application/json' -H 'Authorization: Bearer eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTI0NDU3ODksInN1YiI6ImFkbWluIiwianRpIjoiM2U1Njg0YjYtZDJiYS0xMWVjLTk4ZWMtZGI2YjRiYTM1MTU2IiwibmJmIjoxNjUyNDQ1Nzg5LCJleHAiOjE2NTI0NDc1ODksInJlZnJlc2hUb2tlbkV4cGlyZXNBdCI6MTY1MjQ0ODE4OTMyNSwidG9rZW5UeXBlIjoiSldUX0FjY2VzcyIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.kXtsUu3_WWtOWu9w0mSDfJjwcyiVCa5dgyzNjCGnlF4' 'https://10.62.148.181/api/fdm/v6/operational/systeminfo/default'  | grep -i snort

"snortVersion" : {

"snortVersion" : "3.1.7.1-108",

"snortPackage" : "/ngfw/var/sf/snort-3.1.7.1-108/snort-75-3.1.7.1-108-daq14.tar.bz2",

"type" : "snortversion

FTD or Firepower CLI

On FTD CLI run the show snort3 status command:

> show snort3 status

Currently running Snort 3

The Firepower module supports only Snort 2.

FTD or Firepower Module Troubleshoot file

Complete these steps to verify the Snort version in the FTD troubleshoot file:

1. Open the troubleshoot file and navigate to the folder <filename>-troubleshoot .tar/results-<date>--xxxxxx/command-outputs

2. Open the file usr-local-sf-bin-sfcli.pl show snort3.output:

# pwd

/var/tmp/results-05-06-2022--163203/command-outputs

# cat "usr-local-sf-bin-sfcli.pl show snort3.output"

Output of /ngfw/usr/local/sf/bin/sfcli.pl show snort3:

Currently running Snort 3

The Firepower module supports only Snort 2.

Vulnerability Database (VDB) Version

The VDB version can be verified with the use of these options:

- FMC UI

- FMC REST-API

- FMC troubleshoot file

- FDM UI

- FDM REST API

- FTD CLI

- FTD or Firepower module troubleshoot file

FMC UI

Complete these steps to verify the VDB version on FMC UI:

1. Choose Help > About:

2. Check VDB Version:

FMC CLI

Complete these steps to verify the VDB version on FMC CLI:

1. Access FMC via SSH or console connection.

2. Run the show version command:

> show version

-----------[ FMC-4600-2.cisco.com ]------------

Model                     : Cisco Firepower Management Center 4600 (66) Version 7.1.0 (Build 90)

UUID                      : a10ed34e-d127-11e8-b440-728439d95305

Rules update version      : 2022-05-02-003-vrt

LSP version               : lsp-rel-20220502-1613

VDB version               : 354

---------------------------------------------

FMC REST-API

Complete these steps to verify the VDB version via an FMC REST-API. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -s -k -v -X POST 'https://192.0.2.1/api/fmc_platform/v1/auth/generatetoken' -H 'Authentication: Basic' -u 'admin:Cisco123' | grep -i X-auth-access-token

< X-auth-access-token: 7acdb34c-ea85-47bf-83fe-d77b63f012da

2. Identify the domain that contains the device. In the majority of the REST API queries the domain parameter is mandatory. Use the X-auth-access-token in this query to retrieve the list of domains:

# curl -s -k -X GET 'https://192.0.2.1/api/fmc_platform/v1/info/serverversion' -H 'X-auth-access-token: 7acdb34c-ea85-47bf-83fe-d77b63f012da' | python -m json.tool

{

"items": [

{

"geoVersion": "2022-05-09-001",

"lspVersion": "lsp-rel-20220510-1044",

"serverVersion": "7.1.0 (build 90)",

"sruVersion": "2022-05-10-001-vrt",

"type": "ServerVersion",

"vdbVersion": "build 354 ( 2022-04-27 19:39:56 )"

}

],

"links": {

"self": "https://10.62.184.21/api/fmc_platform/v1/info/serverversion?offset=0&limit=25"

},

"paging": {

"count": 1,

"limit": 25,

"offset": 0,

"pages": 1

}

}

FMC Troubleshoot file

Complete these steps to verify the VDB version in the FMC troubleshoot file:

1. Open the troubleshoot file and navigate to the folder <filename>-troubleshoot .tar/results-<date>--xxxxxx/dir-archives/etc/sf/.versiondb

2. Open the file vdb.conf and find the line with the key CURRENT_BUILD:

# pwd

/var/tmp/results-05-06-2022--199172/dir-archives/etc/sf/.versiondb

# cat vdb.conf

CURRENT_VERSION=4.5.0

CURRENT_BUILD=344

CURRENT_APPID_VER=82

CURRENT_NAVL_VER=106

FDM UI

On the main page check VDB:

FDM REST API

Complete these steps to verify the VDB version via an FDM REST-API request. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -k -X POST --header 'Content-Type: application/json' --header 'Accept: application/json' -d '{ "grant_type": "password", "username": "admin", "password": "Admin#1324" }' 'https://192.0.2.2/api/fdm/latest/fdm/token'

{

"access_token":

"eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTIyNDk5NTcsInN1YiI6ImFkbWluIiwianRpIjoiNDk3MmRjNjAtZDBmMi0xMWVjLTk4ZWMtNDdlZTQwODkwMDVjIiwibmJmIjoxNjUyMjQ5OTU3LCJleHAiOjE2NTIyNTE3NTcsInJlZnJlc2hUb2tlbkV4cGlyZXNBdCI6MTY1MjI1MjM1NzQ1NywidG9rZW5UeXBlIjoiSldUX0FjY2VzcyIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.lJLmHddJ2jaVRmpdXF6qg48qdBcyRuit94DLobCJ9LI",

"expires_in": 1800,

"refresh_expires_in": 2400,

"refresh_token": "eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTIzOTQxNjksInN1YiI6ImFkbWluIiwianRpIjoiMGU0NGIxYzQtZDI0Mi0xMWVjLTk4ZWMtYTllOTlkZGMwN2Y0IiwibmJmIjoxNjUyMzk0MTY5LCJleHAiOjE2NTIzOTY1NjksImFjY2Vzc1Rva2VuRXhwaXJlc0F0IjoxNjUyMzk1OTY5MDcwLCJyZWZyZXNoQ291bnQiOi0xLCJ0b2tlblR5cGUiOiJKV1RfUmVmcmVzaCIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.Avga0-isDjQB527d3QWZQb7AS4a9ea5wlbYUn-A9aPw",

"token_type": "Bearer"

}

2. Use the access_token value in this query:

# curl -s -k -X GET -H 'Accept: application/json' -H 'Authorization: Bearer eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTI0NDU3ODksInN1YiI6ImFkbWluIiwianRpIjoiM2U1Njg0YjYtZDJiYS0xMWVjLTk4ZWMtZGI2YjRiYTM1MTU2IiwibmJmIjoxNjUyNDQ1Nzg5LCJleHAiOjE2NTI0NDc1ODksInJlZnJlc2hUb2tlbkV4cGlyZXNBdCI6MTY1MjQ0ODE4OTMyNSwidG9rZW5UeXBlIjoiSldUX0FjY2VzcyIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.kXtsUu3_WWtOWu9w0mSDfJjwcyiVCa5dgyzNjCGnlF4' 'https://10.62.148.181/api/fdm/v6/operational/systeminfo/default'  | grep -i vdb

"vdbVersion" : {

"lastSuccessVDBDate" : "2022-05-05 12:44:09Z",

"vdbCurrentVersion" : "346",

"vdbCurrentBuild" : "0",

"vdbReleaseDate" : "2021-08-24 21:48:15",

"type" : "vdbversion"

FTD or Firepower Module CLI

Complete these steps to verify the VDB version on the FTD CLI or on the Firepower module (SFR) CLI:

1. Access FTD via SSH or console connection. In the case of the Firepower module, access the module via SSH, or from the ASA CLI via the session sfr command.

2. Run the show version command on CLI:

> show version

--------------------[ fpr2k-1 ]---------------------

Model                     : Cisco Firepower 2110 Threat Defense (77) Version 7.1.0 (Build 90)

UUID                      : 0b1a9c94-8ba8-11ec-b2fd-93263934908d

LSP version               : lsp-rel-20220510-1044

VDB version               : 354

----------------------------------------------------

> show version

----------------[ sfr1 ]-----------------

Model                     : ASA5516 (72) Version 7.1.0 (Build 90)

UUID                      : c049dad8-c42e-11e9-986d-bdeff3ce399e

Rules update version      : 2022-05-10-001-vrt

VDB version               : 354

----------------------------------------------------

FTD or Firepower Module Troubleshoot file

Complete these steps to verify the VDB version in the FTD or the Firepower module troubleshoot file:

1. Open the troubleshoot file and navigate to the folder <filename>-troubleshoot.tar/results-<date>--xxxxxx/command-outputs/

2. Open the file usr-local-sf-bin-sfcli.pl show version.output and find the line with the VDB version:

# pwd

/var/tmp/results-05-06-2022--163203/command-outputs/

# cat "usr-local-sf-bin-sfcli.pl show version.output"

--------------------[ fpr2k-1 ]---------------------

Model                     : Cisco Firepower 2110 Threat Defense (77) Version 7.1.0 (Build 90)

UUID                      : 0b1a9c94-8ba8-11ec-b2fd-93263934908d

LSP version               : lsp-rel-20220510-1044

VDB version               : 354

----------------------------------------------------

# pwd

/var/tmp/results-05-12-2022--199172/command-outputs

# cat "usr-local-sf-bin-sfcli.pl show version.output"

----------------[ sfr1 ]-----------------

Model                     : ASA5516 (72) Version 7.1.0 (Build 90)

UUID                      : c049dad8-c42e-11e9-986d-bdeff3ce399e

Rules update version      : 2022-05-10-001-vrt

VDB version               : 354

----------------------------------------------------

Intrusion rule Update Versions

The intrusion rule updates provide new and updated intrusion rules and preprocessor rules, modified states for installed rules, and modified default intrusion policy settings.

The secure rule updates (SRU) are applicable to Snort version 2, and the Lightweight Security Package (LSP) updates are applicable to Snort version 3.

The SRU/LSP software version can be verified with the use of these options:

- FMC UI

- FMC REST-API

- FMC troubleshoot file

- FDM UI

- FDM REST API

- FTD or Firepower module CLI

- FTD or Firepower module troubleshoot file

FMC UI

Complete these steps to verify SRU/LSP versions on FMC UI:

1. Choose Help > About:

2. Check Rule Update Version and LSP Version:

FMC CLI

Complete these steps to verify SRU/LSP versions on FMC CLI:

1. Access FMC via SSH or console connection.

2. Run the show version command on CLI:

> show version

-----------[ FMC-4600-2.cisco.com ]------------

Model                     : Cisco Firepower Management Center 4600 (66) Version 7.1.0 (Build 90)

UUID                      : a10ed34e-d127-11e8-b440-728439d95305

Rules update version      : 2022-05-02-003-vrt

LSP version               : lsp-rel-20220502-1613

VDB version               : 354

---------------------------------------------

FMC REST-API

Complete these steps to verify the software version via a REST-API request. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -s -k -v -X POST 'https://192.0.2.1/api/fmc_platform/v1/auth/generatetoken' -H 'Authentication: Basic' -u 'admin:Cisco123' | grep -i X-auth-access-token

< X-auth-access-token: 9408fe38-c25c-4472-b7e6-3571bb4e2b8d

2. Use the X-auth-access-token in this query:

# curl -s -k -X GET 'https://192.0.2.1/api/fmc_platform/v1/info/serverversion' -H 'X-auth-access-token: 7acdb34c-ea85-47bf-83fe-d77b63f012da' | python -m json.tool

{

"items": [

{

"geoVersion": "2022-05-09-001",

"lspVersion": "lsp-rel-20220510-1044",

"serverVersion": "7.1.0 (build 90)",

"sruVersion": "2022-05-10-001-vrt",

"type": "ServerVersion",

"vdbVersion": "build 354 ( 2022-04-27 19:39:56 )"

}

],

"links": {

"self": "https://10.62.184.21/api/fmc_platform/v1/info/serverversion?offset=0&limit=25"

},

"paging": {

"count": 1,

"limit": 25,

"offset": 0,

"pages": 1

}

}

FMC Troubleshoot file

Complete these steps to verify the SRU version in the FMC troubleshoot file:

1. Open the troubleshoot file and go to folder <filename>.tar/results-<date>--xxxxxx/dir-archives/etc/sf/

2. Open the file sru_versions.conf and find the lines with keys Intrusion_Rules_Update:

# pwd

/var/tmp/results-05-06-2022--199172/dir-archives/etc/sf/

# cat sru_versions.conf

Intrusion_Rules_Update=2022-04-25-003-vrt

Rule_Pack=2699

Sourcefire_Decoder_Rule_Pack=2088

Sourcefire_Policy_Pack=2763

Module_Pack=3066

snort=2.9.16-4022

Complete these steps to verify LSP version in the FMC troubleshoot file:

1. Open the troubleshoot file and go to folder <filename>.tar/results-<date>--xxxxxx/command-outputs

2. Open file find var-sf-lsp -maxdepth 2 -ls.output and check the line with /var/sf/lsp/active-lsp

# pwd

/var/tmp/results-05-06-2022--199172/command-outputs

# cat "find var-sf-lsp -maxdepth 2 -ls.output"

...

Output of find /var/sf/lsp -maxdepth 2 -ls:

19138123      4 drwxrwxr-x   3  www      root         4096 May 11 04:01 /var/sf/lsp

19142268      0 lrwxrwxrwx   1  root     root           33 May 11 04:00 /var/sf/lsp/installed-lsp -> /var/sf/lsp/lsp-rel-20220510-1044

19138299      4 drwxrwxr-x   5  www      root         4096 May 11 04:01 /var/sf/lsp/lsp-rel-20220510-1044

19142266    600 -rwxrwxr-x   1  www      root       614400 May 10 14:55 /var/sf/lsp/lsp-rel-20220510-1044/lsp.icdb.RELEASE.tar

19142234      4 drwxrwxr-x   5  www      root         4096 May 11 04:00 /var/sf/lsp/lsp-rel-20220510-1044/ntd_metadata

19268898      4 drwxrwxr-x   2  www      root         4096 May 10 14:55 /var/sf/lsp/lsp-rel-20220510-1044/icdb

19138303      4 drwxrwxr-x   6  www      root         4096 May 10 14:51 /var/sf/lsp/lsp-rel-20220510-1044/talos_content

19142269  46640 -rw-r--r--   1  root     root     47759360 May 11 04:01 /var/sf/lsp/lsp-rel-20220510-1044/lsp-rel-20220510-1044.tar.xz.REL.tar

19142267      4 -rwxrwxr-x   1  www      root          238 May 11 04:00 /var/sf/lsp/lsp-rel-20220510-1044/.snort-versions

19142265      4 -rwxrwxr-x   1  www      root           26 May 10 14:51 /var/sf/lsp/lsp-rel-20220510-1044/lspd_ver.properties

19139198    260 -rw-r--r--   1  root     root       264403 Feb 12 03:32 /var/sf/lsp/pigtail-all-1644636642.log

19142270      0 lrwxrwxrwx   1  root     root           33 May 11 04:01 /var/sf/lsp/active-lsp -> /var/sf/lsp/lsp-rel-20220510-1044

FDM UI

On the main page check Intrusion Rule Update:

FDM REST API

Complete these steps to verify the VDB version via an FDM REST-API request. Use a REST-API client to verify the software version. In this example, curl is used:

1. Request an authentication token:

# curl -k -X POST --header 'Content-Type: application/json' --header 'Accept: application/json' -d '{ "grant_type": "password", "username": "admin", "password": "Admin#1324" }' 'https://192.0.2.2/api/fdm/latest/fdm/token'

{

"access_token":

"eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTIyNDk5NTcsInN1YiI6ImFkbWluIiwianRpIjoiNDk3MmRjNjAtZDBmMi0xMWVjLTk4ZWMtNDdlZTQwODkwMDVjIiwibmJmIjoxNjUyMjQ5OTU3LCJleHAiOjE2NTIyNTE3NTcsInJlZnJlc2hUb2tlbkV4cGlyZXNBdCI6MTY1MjI1MjM1NzQ1NywidG9rZW5UeXBlIjoiSldUX0FjY2VzcyIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.lJLmHddJ2jaVRmpdXF6qg48qdBcyRuit94DLobCJ9LI",

"expires_in": 1800,

"refresh_expires_in": 2400,

"refresh_token": "eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTIzOTQxNjksInN1YiI6ImFkbWluIiwianRpIjoiMGU0NGIxYzQtZDI0Mi0xMWVjLTk4ZWMtYTllOTlkZGMwN2Y0IiwibmJmIjoxNjUyMzk0MTY5LCJleHAiOjE2NTIzOTY1NjksImFjY2Vzc1Rva2VuRXhwaXJlc0F0IjoxNjUyMzk1OTY5MDcwLCJyZWZyZXNoQ291bnQiOi0xLCJ0b2tlblR5cGUiOiJKV1RfUmVmcmVzaCIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.Avga0-isDjQB527d3QWZQb7AS4a9ea5wlbYUn-A9aPw",

"token_type": "Bearer"

}

2. Use the access_token value in this query:

# curl -s -k -X GET -H 'Accept: application/json' -H 'Authorization: Bearer eyJhbGciOiJIUzI1NiJ9.eyJpYXQiOjE2NTI0NDU3ODksInN1YiI6ImFkbWluIiwianRpIjoiM2U1Njg0YjYtZDJiYS0xMWVjLTk4ZWMtZGI2YjRiYTM1MTU2IiwibmJmIjoxNjUyNDQ1Nzg5LCJleHAiOjE2NTI0NDc1ODksInJlZnJlc2hUb2tlbkV4cGlyZXNBdCI6MTY1MjQ0ODE4OTMyNSwidG9rZW5UeXBlIjoiSldUX0FjY2VzcyIsInVzZXJVdWlkIjoiYTU3ZGVmMjgtY2M3MC0xMWVjLTk4ZWMtZjk4ODExNjNjZWIwIiwidXNlclJvbGUiOiJST0xFX0FETUlOIiwib3JpZ2luIjoicGFzc3dvcmQiLCJ1c2VybmFtZSI6ImFkbWluIn0.kXtsUu3_WWtOWu9w0mSDfJjwcyiVCa5dgyzNjCGnlF4' 'https://10.62.148.181/api/fdm/v6/operational/systeminfo/default'  | grep -Ei "sru|lsp"

"sruVersion" : {

"sruVersion" : "20211110-1348",

"lastSuccessSRUDate" : "2022-05-12 18:29:00Z",

"lspVersions" : [ "20211110-1348" ],

"type" : "sruversion"

FTD or Firepower Module CLI

Complete these steps to verify SRU/LSP version on FTD CLI or the Firepower module CLI:

1. Access FTD via SSH or console connection. In the case of the Firepower module, access the module via SSH, or from the ASA CLI via the session sfr command.

2. Run the show version command on CLI:

> show version

------------[ FIREPOWER1.cisco.com ]------------

Model                     : Cisco Firepower 2120 Threat Defense (77) Version 7.1.0 (Build 90)

UUID                      : 1cbe9952-cc6f-11ec-b63a-ae4636e42209

LSP version               : lsp-rel-20211110-1348

VDB version               : 346

----------------------------------------------------

or

> show version

------------[ FIREPOWER1.cisco.com ]------------

Model                     : Cisco Firepower 2120 Threat Defense (77) Version 7.1.0 (Build 90)

UUID                      : 1cbe9952-cc6f-11ec-b63a-ae4636e42209

Rules update version      : 2022-05-11-001-vrt

VDB version               : 346

----------------------------------------------------

> show version

----------------[ sfr1 ]-----------------

Model                     : ASA5516 (72) Version 7.1.0 (Build 90)

UUID                      : c049dad8-c42e-11e9-986d-bdeff3ce399e

Rules update version      : 2022-05-10-001-vrt

VDB version               : 354

----------------------------------------------------

Note: The "show version" command shows the SRU update version if Snort 2 is used. For Snort 3 LSP version is shown.

FTD or Firepower Module Troubleshoot file

Complete these steps to verify SRU/LSP versions in the FTD or Firepower module  troubleshoot file:

1. Open the troubleshoot file and go to folder <filename>-troubleshoot.tar/results-<date>--xxxxxx/command-outputs/

2. Open the file usr-local-sf-bin-sfcli.pl show version.output and find the line with SRU/LSP version:

# pwd

/var/tmp/results-05-06-2022--163203/command-outputs/

# cat "usr-local-sf-bin-sfcli.pl show version.output"

------------[ FIREPOWER1.cisco.com ]------------

Model                     : Cisco Firepower 2120 Threat Defense (77) Version 7.1.0 (Build 90)

UUID                      : 1cbe9952-cc6f-11ec-b63a-ae4636e42209

LSP version               : lsp-rel-20211110-1348

VDB version               : 346

----------------------------------------------------

or

# pwd

/var/tmp/results-05-06-2022--163203/command-outputs/

# cat "usr-local-sf-bin-sfcli.pl show version.output"

------------[ FIREPOWER1.cisco.com ]------------

Model                     : Cisco Firepower 2120 Threat Defense (77) Version 7.1.0 (Build 90)

UUID                      : 70727d06-8ba7-11ec-bfcc-999f61f27102

Rules update version      : 2022-05-11-001-vrt

VDB version               : 346

----------------------------------------------------

# pwd

/var/tmp/results-05-12-2022--199172/command-outputs

# cat "usr-local-sf-bin-sfcli.pl show version.output"

----------------[ sfr1 ]-----------------

Model                     : ASA5516 (72) Version 7.1.0 (Build 90)

UUID                      : c049dad8-c42e-11e9-986d-bdeff3ce399e

Rules update version      : 2022-05-10-001-vrt

VDB version               : 354

----------------------------------------------------

Known Issues

Cisco bug ID CSCwb34098 ENH: Show FMC version in 'show managers' command output

Cisco bug ID CSCve13470   ENH: Enable Software Related OIDs on FirePOWER 6.x

Cisco bug ID CSCwb85969 ENH: Include output of "show version" FMC CLISH command in troubleshoot file

Cisco bug ID CSCvu15709   ENH: Support for SNMP OIDs to poll SRU/VDB/GEO location versions on Firepower platforms

Related Information

- Secure Firewall Management Center REST API Quick Start Guide, Version 7.1

- Configure SNMP on Firepower NGFW Appliances

- Cisco Firepower Threat Defense REST API Guide

- Cisco FXOS REST API Reference

- Cisco ASA Compatibility

- Firepower 1000/2100 and Secure Firewall 3100 ASA and FXOS Bundle Versions

- Bundled Components

- Firepower Troubleshoot File Generation Procedures